Time (s)

0 0.428345 0

8000

Frequency (Hz)

0 1000

2000

3000

4000

5000

6000

7000

Temne. Apical Dental

Time (s)

0 0.450023 0

8000

Frequency (Hz)

0 1000

2000

3000

4000

5000

6000

7000

Temne. Laminal Alveolar